Aircraft Characteristics Chart

AlliedAircraft Stability Engine Wings Fuselage Tail Fuel Armament Max. Alt. Ansaldo SVA5 A 8 28 25 5 60 2F VH+ Avro 504K A 6 32 28 5 60 1FL H Bristol F.2B A 8 40 28 6 67 1F, 1OL & VH Bristol Scout D B 6 20 21 5 45 1FL # H DeHaviland DH-2 B 6 25 25 6 45 1FL H DeHaviland DH-4 B 8 40 28 6 52 1F, 1OL H DeHaviland DH-5 B 6 23 22 6 45 1F H DeHaviland DH-9 B 8 40 30 6 67 1F, 1 or 2 OL H+ Morane-Saulnier N C 6 16 22 4 45 1F M+ Nieuport 11 B 6 19 19 4 45 1FL H Nieuport 12 B 6 24 23 4 45 1OL H Nieuport 17 B 6 13 20 4 45 1F* H Nieuport 28 B 6 22 20 5 45 2F H RAF S.E.5 A 8 26 21 5 52 1F, 1FL VH RAF S.E.5.A A 8 24 21 5 52 1F, 1FL VH RAF RE-8 B 8 40 27 6 52 1F, 1OL H Sopwith Camel C 6 24 18 4 55 2F H Sopwith 2F1 Camel C 6 22 18 4 55 1F, 1FL H Bently Powered Camel C 6 24 18 4 55 2F VH Night Fighter F1 Camel C 6 24 18 4 55 2FL H Sopwith 1 1/2 Strutter A 6 28 25 6 60 1F, 1OL H Sopwith Pup B 6 19 25 4 50 1F H Sopwith Snipe A 6 27 19 5 67 2F H Sopwith Triplane A 6 23 18 4 52 1F VH Spad VII B 8 22 20 5 52 1F H Spad XIII B 8 24 20 6 52 2F VH German Aircraft Stability Engine Wings Fuselage Tail Fuel Armament Max. Alt.

Albatros D-II B 8 24 24 6 49 2F H Albatros D-IIIb B 8 22 24 6 45 2F H Albatros D-Va B 8 22 24 6 45 2F H Fokker E-III C 6 17 23 4 45 1F M+ Fokker DVI A 6 21 20 5 37 2F VH Fokker DVII A 8 22 22 5 37 2F H+ Fokker DVIII A 6 18 19 5 37 2F VH+ Fokker Dr-I C 6 18 19 5 37 2F H+ Halberstadt D-II B 8 25 24 4 45 1F H Halberstadt CLIIIa B 8 28 23 5 67 1F, 1O H Pfalz E-III C 6 16 22 4 45 1F M+ Pfalz DIIIa B 8 23 27 5 45 2F H Pfalz DXII B 8 23 20 5 55 2F H Roland C-II B 8 30 25 6 65 1F, 1O H L.F.G. Roland D-VIb A 8 25 21 6 45 2F VH Siemens-Schuckert D-I B 6 13 20 4 45 1F H Siemens-Schuckert DIII A 6 20 18 5 45 2F VH+ Siemens-Schuckert DIV A 6 20 18 5 45 2F VH+ & - Some Briston F.2Bs carried 2OL instead. It is reccomended that only 1 be allowed per game. + - Aircraft my regain maximum altitude # - Bristol Scout also flew unarmed and with single Vickers (1F) * - Some Nieuport 17s flew with an additional 1FL